
diff -r 1077b272c18e -r d627d9bc15c8 slides02.tex
--- /dev/null	Thu Jan 01 00:00:00 1970 +0000
+++ b/slides02.tex	Tue Oct 02 06:39:11 2012 +0100
@@ -0,0 +1,373 @@
+\documentclass[dvipsnames,14pt,t]{beamer}
+\usepackage{beamerthemeplainculight}
+\usepackage[T1]{fontenc}
+\usepackage[latin1]{inputenc}
+\usepackage{mathpartir}
+\usepackage[absolute,overlay]{textpos}
+\usepackage{ifthen}
+\usepackage{tikz}
+\usepackage{pgf}
+\usepackage{calc} 
+\usepackage{ulem}
+\usepackage{courier}
+\usepackage{listings}
+\renewcommand{\uline}[1]{#1}
+\usetikzlibrary{arrows}
+\usetikzlibrary{automata}
+\usetikzlibrary{shapes}
+\usetikzlibrary{shadows}
+\usetikzlibrary{positioning}
+\usetikzlibrary{calc}
+\usepackage{graphicx} 
+
+\definecolor{javared}{rgb}{0.6,0,0} % for strings
+\definecolor{javagreen}{rgb}{0.25,0.5,0.35} % comments
+\definecolor{javapurple}{rgb}{0.5,0,0.35} % keywords
+\definecolor{javadocblue}{rgb}{0.25,0.35,0.75} % javadoc
+
+\lstset{language=Java,
+	basicstyle=\ttfamily,
+	keywordstyle=\color{javapurple}\bfseries,
+	stringstyle=\color{javagreen},
+	commentstyle=\color{javagreen},
+	morecomment=[s][\color{javadocblue}]{/**}{*/},
+	numbers=left,
+	numberstyle=\tiny\color{black},
+	stepnumber=1,
+	numbersep=10pt,
+	tabsize=2,
+	showspaces=false,
+	showstringspaces=false}
+
+\lstdefinelanguage{scala}{
+  morekeywords={abstract,case,catch,class,def,%
+    do,else,extends,false,final,finally,%
+    for,if,implicit,import,match,mixin,%
+    new,null,object,override,package,%
+    private,protected,requires,return,sealed,%
+    super,this,throw,trait,true,try,%
+    type,val,var,while,with,yield},
+  otherkeywords={=>,<-,<\%,<:,>:,\#,@},
+  sensitive=true,
+  morecomment=[l]{//},
+  morecomment=[n]{/*}{*/},
+  morestring=[b]",
+  morestring=[b]',
+  morestring=[b]"""
+}
+
+\lstset{language=Scala,
+	basicstyle=\ttfamily,
+	keywordstyle=\color{javapurple}\bfseries,
+	stringstyle=\color{javagreen},
+	commentstyle=\color{javagreen},
+	morecomment=[s][\color{javadocblue}]{/**}{*/},
+	numbers=left,
+	numberstyle=\tiny\color{black},
+	stepnumber=1,
+	numbersep=10pt,
+	tabsize=2,
+	showspaces=false,
+	showstringspaces=false}
+
+% beamer stuff 
+\renewcommand{\slidecaption}{APP 02, King's College London, 2 October 2012}
+
+
+\begin{document}
+
+%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
+\mode<presentation>{
+\begin{frame}<1>[t]
+\frametitle{%
+  \begin{tabular}{@ {}c@ {}}
+  \\
+  \LARGE Access Control and \\[-3mm] 
+  \LARGE Privacy Policies (2)\\[-6mm] 
+  \end{tabular}}\bigskip\bigskip\bigskip
+
+  %\begin{center}
+  %\includegraphics[scale=1.3]{pics/barrier.jpg}
+  %\end{center}
+
+\normalsize
+  \begin{center}
+  \begin{tabular}{ll}
+  Email:  & christian.urban at kcl.ac.uk\\
+  Of$\!$fice: & S1.27 (1st floor Strand Building)\\
+  Slides: & KEATS (also home work is there)
+  \end{tabular}
+  \end{center}
+
+
+\end{frame}}
+ %%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%     
+
+%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
+\mode<presentation>{
+\begin{frame}[c]
+\frametitle{\begin{tabular}{c}Homework\end{tabular}}
+
+
+\ldots{} I have a question about the homework.\\[3mm] 
+Is it required to submit the homework before\\ 
+the next lecture?\\[5mm]
+
+Thank you!\\
+Anonymous
+  
+\end{frame}}
+%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%   
+
+
+%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
+\mode<presentation>{
+\begin{frame}[c]
+\frametitle{\begin{tabular}{@ {}c@ {}}SmartWater\end{tabular}}
+
+\begin{textblock}{1}(1,3)
+\begin{tabular}{c}
+\includegraphics[scale=0.15]{pics/SmartWater}
+\end{tabular}
+\end{textblock}
+
+
+\begin{textblock}{8.5}(7,3)
+\begin{itemize}
+\item seems helpful for preventing cable theft\medskip
+\item wouldn't be helpful to make your property safe, because of possible abuse\medskip
+
+\item security is always a tradeoff
+\end{itemize}
+\end{textblock}
+
+\end{frame}}
+%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%     
+
+%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
+\mode<presentation>{
+\begin{frame}[c]
+\frametitle{\begin{tabular}{@ {}c@ {}}Plaintext Passwords from IEEE\end{tabular}}
+
+\small\textcolor{gray}{On 25 September 2012, a report on a data breach at IEEE:}
+
+
+\begin{itemize}
+\item IEEE is a standards organisation (not for profit) 
+\item many standards in CS are by IEEE\medskip
+\item 100k plain-text passwords were recorded in logs
+\item the logs were openly accessible on their FTP server
+\end{itemize}\bigskip
+
+\begin{flushright}\small
+\textcolor{gray}{\url{http://ieeelog.com}}
+\end{flushright}
+
+\only<2>{
+\begin{textblock}{11}(3,2)
+\begin{tikzpicture}
+\draw (0,0) node[inner sep=2mm,fill=white, ultra thick, draw=red, rounded corners=2mm] 
+{\normalsize\color{darkgray}
+\begin{minipage}{7.5cm}\raggedright\small
+\includegraphics[scale=0.6]{pics/IEEElog.jpg}
+\end{minipage}};
+\end{tikzpicture}
+\end{textblock}}
+
+\end{frame}}
+%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%   
+
+
+%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
+\mode<presentation>{
+\begin{frame}[c]
+\frametitle{\begin{tabular}{@ {}c@ {}}Virgin Mobile (USA)\end{tabular}}
+
+\begin{flushright}\small
+\textcolor{gray}{\url{http://arstechnica.com/security/2012/09/virgin-mobile-password-crack-risk/}}
+\end{flushright}
+
+\begin{itemize}
+\item for online accounts passwords must be 6 digits
+\item you must cycle through 1M combinations (online)\pause\bigskip
+
+\item he limited the attack on his own account to 1 guess per second, \alert{\bf and}
+\item wrote a script that cleared the cookies set after each guess
+\end{itemize}
+
+
+
+\end{frame}}
+%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%   
+
+
+%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
+\mode<presentation>{
+\begin{frame}[c]
+\frametitle{\begin{tabular}{@ {}c@ {}}Smash the Stack for Fun\ldots\end{tabular}}
+
+\begin{itemize}
+\item ``smashing the stack attacks'' or ``buffer overflow attacks''
+\item one of the most popular attacks\\ ($>$ 50\% of security incidents reported at CERT are related to buffer overflows)\medskip
+\item made popular in an article by Elias Levy\\ (also known as Aleph One):\\
+\begin{center}
+{\bf ``Smashing The Stack For Fun and Profit''}
+\end{center}\bigskip
+
+\begin{flushright}
+\small
+\textcolor{gray}{\url{http://www.phrack.org}, Issue 49, Article 14}
+\end{flushright} 
+ 
+\end{itemize}
+
+
+\end{frame}}
+%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%   
+
+%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
+\mode<presentation>{
+\begin{frame}[c]
+\frametitle{\begin{tabular}{c}The Problem\end{tabular}}
+
+\begin{itemize}
+\item The basic problem is that library routines look as follows:
+\begin{center}
+{\lstset{language=Java}\fontsize{8}{10}\selectfont%
+\texttt{\lstinputlisting{app5.c}}}
+\end{center}
+\item the resulting problems are often remotely exploitable 
+\item can be used to circumvents all access control
+\end{itemize}
+  
+\end{frame}}
+%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%   
+
+%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
+\mode<presentation>{
+\begin{frame}[c]
+
+\small
+\texttt{my\_float} is printed twice:\bigskip
+
+{\lstset{language=Java}\fontsize{8}{10}\selectfont%
+\texttt{\lstinputlisting{C1.c}}}
+
+  
+\end{frame}}
+%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%   
+
+%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
+\mode<presentation>{
+\begin{frame}[c]
+
+\begin{center}
+\onslide<1->{\includegraphics[scale=0.5]{pics/stack1}\;\;}
+\onslide<2->{\includegraphics[scale=0.5]{pics/stack2}\;\;}
+\onslide<3->{\includegraphics[scale=0.5]{pics/stack3}\;\;}
+\end{center}
+  
+  
+\end{frame}}
+%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%   
+
+%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
+\mode<presentation>{
+\begin{frame}[c]
+
+{\lstset{language=Java}\fontsize{8}{10}\selectfont%
+\texttt{\lstinputlisting{C2.c}}}
+
+  
+\end{frame}}
+%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%   
+
+%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
+\mode<presentation>{
+\begin{frame}[c]
+
+\small
+A programmer might be careful, but still introducing vulnerabilities:\bigskip
+
+{\lstset{language=Java}\fontsize{8}{10}\selectfont%
+\texttt{\lstinputlisting{C2a.c}}}
+
+  
+\end{frame}}
+%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%   
+
+%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
+\mode<presentation>{
+\begin{frame}[c]
+\frametitle{\begin{tabular}{c}Payloads\end{tabular}}
+
+\begin{itemize}
+\item the idea is you store some code as part to the buffer
+\item you then override the return address to execute this payload\medskip
+\item normally you start a root-shell\pause
+\item difficulty is to guess the place where to ``jump''
+\end{itemize}
+  
+\end{frame}}
+%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%   
+
+%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
+\mode<presentation>{
+\begin{frame}[c]
+\frametitle{\begin{tabular}{c}Payloads (2)\end{tabular}}
+
+\begin{itemize}
+\item another difficulty is that the code is not allowed to contain \texttt{$\backslash$x00}:
+
+\begin{center}
+\texttt{xorl   \%eax, \%eax}
+\end{center}
+\end{itemize}\bigskip\bigskip
+  
+{\lstset{language=Java}\fontsize{8}{10}\selectfont%
+\texttt{\lstinputlisting{app5.c}}}
+  
+\end{frame}}
+%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%   
+
+
+%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
+\mode<presentation>{
+\begin{frame}[c]
+\frametitle{\begin{tabular}{c}Format String Vulnerability\end{tabular}}
+
+\small
+\texttt{string} is nowhere used:\bigskip
+
+{\lstset{language=Java}\fontsize{8}{10}\selectfont%
+\texttt{\lstinputlisting{C6.c}}}\bigskip
+
+this vulnerability can be used to read out the stack
+  
+\end{frame}}
+%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%   
+
+%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
+\mode<presentation>{
+\begin{frame}[c]
+\frametitle{\begin{tabular}{c}Protections against BO Attacks\end{tabular}}
+
+\begin{itemize}
+\item use safe library functions
+\item ensure stack data is not executable (can be defeated)
+\item address space randomisation (makes one-size-fits-all more difficult)
+\item choice of programming language (one of the selling points of Java)
+
+\end{itemize}
+  
+\end{frame}}
+%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%   
+
+
+\end{document}
+
+%%% Local Variables:  
+%%% mode: latex
+%%% TeX-master: t
+%%% End: 
+




