
diff -r dac7bab6cfea -r 968ff3fb17c6 slides/slides01.tex
--- a/slides/slides01.tex	Sun Sep 24 16:48:52 2017 +0100
+++ b/slides/slides01.tex	Sun Sep 24 17:47:52 2017 +0100
@@ -388,7 +388,7 @@
 \begin{tabular}{l}
 \footnotesize on BBC Newsnight\\[-2mm] 
 \footnotesize in 2010 or 
-\href{http://www.youtube.com/watch?v=JPAX32lgkrw}{youtube}
+\href{https://www.youtube.com/watch?v=Ks0SOn8hjG8}{youtube}
 \end{tabular}
 \end{textblock}
   
@@ -504,7 +504,7 @@
 card at a store. Same applies if someone cloned your CC
 reading the magnetic stripe or sniffing RFID. Only losing your
 VBV or MCSC password can cause serious trouble.''\\
-\hfill{}\url{www.goo.gl/UWluh0}
+\hfill{}\url{https://news.ycombinator.com/item?id=3960034}
 \end{bubble}
 
 \end{frame}
@@ -581,14 +581,14 @@
 A simple response from the server:
 
 \small
-\lstinputlisting{../progs/ap0.js}
+\lstinputlisting[xleftmargin=0.5cm]{../progs/ap0.js}
 \medskip\pause
 
 \small
-alternative response:\smallskip\\
+an alternative response:\smallskip\\
 
 
-\lstinline{response.write('<H1>Hello World</H1>');}
+\hspace{5mm}\lstinline{response.write('<H1>Hello World</H1>');}
 
 \end{frame}
 %%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%   
@@ -654,7 +654,7 @@
 
 \only<5>{
 \begin{textblock}{11}(1,3)
-\begin{bubble}[10cm]\small
+\begin{bubble}[10.2cm]\small
 {\bf Cookie Law:}\smallskip\\ ``In May 2011, a
 European Union law was passed stating that websites that leave
 non-essential cookies on visitors' devices have to alert the visitor
@@ -664,8 +664,8 @@
 to simply update a website's terms and conditions or privacy
 policy. The deadline to comply with the new EU cookie law was 26th May
 2012 and failure to do so could mean a fine of up to
-\pounds{500,000}.''  \hfill\small\textcolor{gray}{$\rightarrow$BBC
-  News}, \url{www.goo.gl/RI4qhh}
+\pounds{500,000}.''\\ \mbox{}\hfill\small\textcolor{gray}{$\rightarrow$BBC
+  News}, \url{http://www.goo.gl/RI4qhh}
 \end{bubble}
 \end{textblock}}
   
@@ -869,7 +869,8 @@
 \end{itemize}\medskip
 
 \small
-(users typically maintain 25 separate accounts but use just 6.5 passwords.)
+(users typically maintain 25 separate accounts but use just 6.5 passwords
+on average)
 
 \end{frame}}
 %%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%   




