
diff -r f76e1456b365 -r 76f9457b8f51 hws/hw02.tex
--- a/hws/hw02.tex	Fri Sep 30 19:55:35 2016 +0100
+++ b/hws/hw02.tex	Tue Oct 04 13:44:05 2016 +0100
@@ -90,9 +90,10 @@
   tallying. What can still go wrong with such a perfectly secure
   voting system, which is prevented in traditional elections with
   paper-based ballots?
+
+\item \POSTSCRIPT
 \end{enumerate}
 
-
 \end{document}
 
 %%% Local Variables: 




