
diff -r c30668124312 -r 0f824ca252e4 hws/hw01.tex
--- a/hws/hw01.tex	Thu Oct 15 14:06:47 2015 +0100
+++ b/hws/hw01.tex	Sat Oct 17 11:31:12 2015 +0100
@@ -109,13 +109,13 @@
 \item What is the difference between a brute force attack and a 
   dictionary attack on passwords? 
   
-\item Even good passwords consisting of 8 characters, can be 
-  broken in around 50 days (obviously this time varies a lot and
-  also gets shorter and shorter). Do you think it is good 
-  policy to require users to change their password every 3 
-  months (as King's did until recently)? Under which 
-  circumstance should users be required to change their 
-  password?
+\item Even good passwords consisting of 8 characters, can be
+      broken in around 50 days (obviously this time varies a
+      lot and also gets shorter and shorter over time). Do you
+      think it is good policy to require users to change their
+      password every 3 months (as King's did until recently)?
+      Under which circumstance should users be required to
+      change their password?
 
 \item What are good uses of cookies (that is browser cookies)?
 




